-0.4 -0.2 0 0.2 0.4 0 5 10 15 20 25 IC-IA

Number of probes

Intensity difference (a.u.)

-0.4 -0.2 0 0.2 0.4 0 5 10 15 20 25 IG-IA

Intensity difference (a.u.)

-0.4 -0.2 0 0.2 0.4 0 5 10 15 20 25 IG-IC

Intensity difference (a.u.)

-0.4 -0.2 0 0.2 0.4 0 5 10 15 20 25 IT-IA

Intensity difference (a.u.)

-0.4 -0.2 0 0.2 0.4 0 5 10 15 20 25 IT-IC

Intensity difference (a.u.)

-0.4 -0.2 0 0.2 0.4 0 5 10 15 20 25 IT-IG

Intensity difference (a.u.)