-1 -0.5 0 0.5 1 0 20 40 60 80 100 120 140 160 180 200

Correlation Coefficient

Number of Simulations

New York: School and AH

-1 -0.5 0 0.5 1 0

100

200

300

400

500

600

Correlation Coefficient

New York: School (With Breaks)

-1 -0.5 0 0.5 1 0

50

100

150

200

250

Correlation Coefficient

New York: School (No Breaks)

-1 -0.5 0 0.5 1 0

50

100

150

200

250

Correlation Coefficient

New York: AH Only Mean = 0.46

Mean = -0.066

Mean = 0.23

Mean = 0.50