-0.1 0.1 0

0.05

0.1 p v_i [cm/h]

A

-0.1 0.1 v_i [cm/h]

-0.1 0.1 v_i [cm/h]

-0.1 0.1 v_i [cm/h]

<p> σ _p

-0.1 0.1 0

0.05

0.1 p v_i

B

-0.1 0.1 v_i

-0.1 0.1 v_i

-0.1 0.1 v_i

-1 0 1 0

0.05

0.1 p v_i

C

-1 0 1

v_i

-1 0 1 v_i

-1 0 1 v_i