0 4 8 0 0.05 0.1 0.15 0.2 p d_i [cm]

A

0 4 8 d_i [cm]

0 4 8 d_i [cm]

0 4 8 d_i [cm]

<p> σ _p

0 3 0

0.05

0.1 p d_i

B

0 3 d_i 0 3 d_i 0 3 d_i

0 4 8 0 0.02

0.04

0.06

0.08 p d_i

C

0 4 8 d_i

0 4 8 d_i

0 4 8 d_i