σ (Pa) 0.05 0.18 0.3 0.5 DR([Ca^{2+}]_{ext} =3 mM) 1% 3% 5% 50%

[Ca^{2+} ]ext (mM) 0.01 0.1 1 3 5 10 50 DR(σ=0.18 Pa) 1% 1% 2% 3% 1% 2% 1%