1 10 20 30 40 50 0.8 1 1.2

1 10 20 30 40 50 0.1 0.15 0.2

1 10 20 30 40 50 0.1 0.2 0.3 0.4

1 10 20 30 40 50 0 2 4

1 10 20 30 40 50 -2 0 2

1 10 20 30 40 50 0 100 200 300

1 10 20 30 40 50 -10

0

10

Trial

1 10 20 30 40 50

0.15 0.2 0.25 0.3

Trial

Frequency (Hz) Mut.Info. (nat) Amplitude (m) Sensitivity θk (rad)

Exp. Force (N

2)θk (rad/s)

Mean Jerk ¯

Execution Variables Strategy Measures