2.0mg/kg/week

0 2500 5000 7500 1000012500

-100 -50 0 50 100

Changeof6MWT(m)

Cmax(ng/mL)

2.0mg/kg/week

0 1000000 2000000

-100 -50 0 50 100

Changeof6MWT(m)

AUC0-t(min*ng/mL)

2.0mg/kg/qow

0 2500 5000 7500 1000012500

-100 -50 0 50 100

Changeof6MWT(m)

Cmax(ng/mL)

2.0mg/kg/qow

0 1000000 2000000

-100 -50 0 50 100

Changeof6MWT(m)

AUC0-t(min*ng/mL)