0 1 2 3 4 5 0

0.5

1

1.5

Oxygen / ppmv × 10^3 τ_0/τ -1

K_{SV} = 0.516 × 10^{-3} ppmv^{-1}, f = 0.86

a_{0 2 4 6}

Oxygen / µM

0 0.5 1 0

0.5

1

1.5

2

Oxygen / ppmv × 10^3 τ_0/τ -1

K_{SV} = 2.57 × 10^{-3} ppmv^{-1}, f = 0.77

b_{0 0.5 1 1.5}

Oxygen / µM