0 100 200 300 400 500 400

600

800

1000

1200

Oxygen / ppmv

Decaytime / µs

10°C 20°C 30°C

0 100 200 300 400 500 600 700

Oxygen / nM a

0 100 200 300 400 500 0

0.5

1

1.5

2

Oxygen / ppmv τ_0/τ-1

10°C; K_{SV}= 6.27 ×10^{-3}ppmv^{-1}; f = 0,86 20°C; K_{SV}= 6.24 ×10^{-3}ppmv^{-1}; f = 0,86 30°C; K_{SV}= 6.19 ×10^{-3}ppmv^{-1}; f = 0,86

0 100 200 300 400 500 600 700

Oxygen / nM b