Principal component 1

-200 -150 -100 -50 0 50 100

Principal component 2

-50 -40 -30 -20 -10 0 10 20 30 40

AB

C

D

EFG

H IJ

K

L M

N

O P

Q

R

S

Datasets A B and C points distributed in odor space