0 0.1 0.2 0.3 0.4 0.5 0

2

4

6

8

τ γ

A : IR

ρ_1 > 0

ρ_1 = 0 ρ_2 > 0 ρ_3 = 0

ρ_n < 0 ρ_3 > 0

ρ_2 = 0