SOL

Parallel (m/s^2)

-3 -2 -1 0 1 2 GAS RF VAS HAM GMAX IL GMED Gravity

Normal (m/s^2)

-10 -5 0 5

Medial (m/s^2)

0 30 60

-0.5 0 0.5 1

0 30 60 0 30 60 0 30 60 0 30 60 0 30 60 0 30 60 0 30 60

-9^° -6^° -3^° 0^° 3^° 6^° 9^°

% Ipsilateral (Left) Leg Gait Cycle

0 30 60

Induced Body COM Accelerations During Stance