2 4 6 8 0.0 0.2 0.4 0.6 0.8 1.0 BT-474, Tras-647

InternalFraction ofSurface Saturation

( ) (Surface) hdt ∫

Y = 0.05417*X - 0.008550 R^2 = 0.9705

2 4 6 8 0.0 0.2 0.4 0.6 0.8 1.0 BT-474, TM-ADC-647

InternalFraction ofSurface Saturation

( ) (Surface) hdt ∫

Y = 0.1078*X - 0.01709 R^2 = 0.9217

2 4 6 8 0.0 0.2 0.4 0.6 0.8 1.0 N87, Tras-647

InternalFraction ofSurface Saturation

( ) (Surface) hdt ∫

Y = 0.03501*X - 0.007564 R^2 = 0.8978

2 4 6 8 0.0 0.2 0.4 0.6 0.8 1.0 N87, TM-ADC-647

InternalFraction ofSurface Saturation

( ) (Surface) hdt ∫

Y = 0.05080*X - 0.002117 R^2 = 0.9683

2 4 6 8 0.0 0.2 0.4 0.6 0.8 1.0 SK-BR-3, Tras-647

InternalFraction ofSurface Saturation

( ) (Surface) hdt ∫

Y = 0.04280*X - 0.006169 R^2 = 0.9743

2 4 6 8 0.0 0.2 0.4 0.6 0.8 1.0 SK-BR-3, TM-ADC-647

InternalFraction ofSurface Saturation

( ) (Surface) hdt ∫

Y = 0.08911*X - 0.02097 R^2 = 0.9610