∂_tD_N (r, z, t) =

− μ_{DN} D_N

natural decay

+ Γ(ϵ, r, z, U)(C_U + C_E + S_A + ∫ (C_T + S_T )da)

Cell death due to chronic strain

, (7a)

with initial condition D_N (r, z, 0) = 0. (7b)