0 60 120 180 240 200

250

300

350

TIME (min) ppERK(AFU)

-6 -7 -8 -9 -10 -11 -12

0 60 120 180 240

0.45

0.50

0.55

0.60

0.65

0.70

TIME (min)

NFAT-NF

-6 -7 -8 -9 -10 -11 -12

2.2 2.4 2.6 2.8 0.0

0.1

0.2 ctrl. -9 -10 -6

5 min

ppERK (log AFU)

Frequency

-0.8 -0.6 -0.4 -0.2 0.0 0.0 0.1 0.2 0.3 30 min

NFAT-NF (log)

Frequency

-6 -9 ctrl. -10

A

C

B

D