0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0.45 0.5 Proportion of asynchronously updating particles N_a 0 0.2 0.4 0.6 0.8 1

Mean polarisation ( )

Asynchronous update before synchronous

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0.45 0.5 Proportion of asynchronously updating particles N_a 0 0.2 0.4 0.6 0.8 1

Mean polarisation ( )

Asynchronous update after synchronous

N=10 N=50 N=100 N=200