0 2 4 6 8 10 12 14 0 20 40 60 80 100 Overall survival of MEN1 gastrinoma patients

Years since gastrinoma diagnosis

Percent survival

Gastrinoma

No. at risk T=0 T=2 T=4 T=6 T=8 T=10 T=12 T=14 Gastrinoma 63 52 39 25 18 16 10 7

A)

0 2 4 6 8 10 12 14 0 20 40 60 80 100 Overall survival of MEN1 patients with and without gastrinomas

Years since gastrinoma diagnosis or first FSG measurement

Percent survival

No gastrinoma Gastrinoma

Log rank p-value <0.001 HR 3.44 (95% CI 1.89 - 6.27, p<0.001)

No. at risk T=0 T=2 T=4 T=6 T=8 T=10 T=12 T=14 Gastrinoma 63 52 39 25 18 16 10 7 No gastrinoma 294 260 214 163 132 99 73 54

B)

0 2 4 6 8 10 12 14 0 20 40 60 80 100 Overall survival of MEN1 patients with and without gastrinomas age and gender matched

Years since gastrinoma diagnosis or first FSG measurement

Percent survival

Gastrinoma

No gastrinoma

Log rank p-value = 0.038 HR 2.37 (95% CI 1.02 - 5.50, p=0.045)

No. at risk T=0 T=2 T=4 T=6 T=8 T=10 T=12 T=14 Gastrinoma 63 52 39 25 18 16 10 7 No gastrinoma 63 55 46 31 23 17 11 11

C)