0 2 4 6 8 10

5 6 7 8

Link density (per fiber)

0 2 4 6 8 10 0

0.5

1

1.5

2

Bundle density

0 2 4 6 8 10 0

5

10

15

% in bundles

0 2 4 6 8 10 1 2 3 4 5 6 7

Max bundle size