\documentclass[main.tex]{subfiles}
\usepackage[figurename=Fig. S]{caption}
\begin{document}

\begin{figure}[h]
\includegraphics[scale=.2]{images/IEM_Supplemental_Diagram.jpg}
  \caption{IEM reconstructions using a data threshold-based channel selection method, where channels were included in the model if the patient spent a cumulative minimum of 2500ms within that channel's radius during search. Here, the Guassian shape parameters were manually set at 1 1/3 AU stimulus size and 1.2 AU receptive field size in order to accomplish a smooth reconstruction. The reconstruction from hippocampal data was significantly mean-proximal at both shorter latencies (0-days: $p_{rot}$=0.009; 7-days: $p_{rot}$=0.007)  but not at the longer latencies (13-days: $p_{rot}$=0.082; 20-days: $p_{rot}$=0.546). The inverse was true for reconstructions from mPFC data, with significant mean-proximal reconstructions at the longer latencies (13-days: $p_{rot}$=0.049; 20-days: $p_{rot}$=0.002) but not the shorter latencies (0-days: $p_{rot}$=0.613; 7-days: $p_{rot}$=0.1).}
\end{figure}
\end{document}