WT FMR1 0 5 10 15 20 25

Lhb mRNA

*

WT FMR1 0.0

0.2

0.4

0.6

0.8

Fshb mRNA

*

WT FMR1 0

1

2

3

Cga mRNA

WT FMR1 0

1

2

3

Gnrhr mRNA

WT FMR1 0

1

2

3

Gh mRNA

WT FMR1 0.0 0.5 1.0 1.5 2.0 2.5

Tshb mRNA

WT FMR1 0 1 2 3 4 5

Pomc mRNA

WT FMR1 0.0 0.5 1.0 1.5 2.0 2.5

Prl mRNA supplement 1